[et_pb_section fb_built="1" inner_shadow="on" _builder_version="4.27.4" _module_preset="default" background_color="#ffffff" height="100px" custom_padding="||||false|false" hover_enabled="0" custom_css_main_element="display:flex;||flex-direction:column;" global_colors_info="{}" sticky_enabled="0"][et_pb_row _builder_version="4.27.4" _module_preset="default" column_structure="1_5,3_5,1_5" hover_enabled="0" sticky_enabled="0"][et_pb_column _builder_version="4.27.4" _module_preset="default" type="1_5"][et_pb_image src="https://www.cembenchmarking.com/wp-content/uploads/2024/11/CEMBenchmarking_logo_RGB_transparent-1-1.png" _builder_version="4.27.4" _module_preset="default" title_text="CEM Benchmarking logo RGB transparent PNG" hover_enabled="0" sticky_enabled="0"][/et_pb_image][/et_pb_column][et_pb_column _builder_version="4.27.4" _module_preset="default" type="3_5"][et_pb_menu _builder_version="4.27.4" _module_preset="default" text_orientation="center" menu_font_size="17px" hover_enabled="0" sticky_enabled="0"][/et_pb_menu][/et_pb_column][et_pb_column _builder_version="4.27.4" _module_preset="default" type="1_5"][et_pb_button button_text="Login" _builder_version="4.27.4" _module_preset="default" hover_enabled="0" sticky_enabled="0" box_shadow_style="none"][/et_pb_button][/et_pb_column][/et_pb_row][/et_pb_section]