[et_pb_section fb_built="1" admin_label="Footer" _builder_version="4.27.4" _module_preset="default" background_color="rgba(0,39,102,0.99)" background_enable_image="off" background_size="initial" width="100%" min_height_tablet="" min_height_phone="642px" min_height_last_edited="on|tablet" height="323px" height_tablet="323px" height_phone="323px" height_last_edited="on|tablet" top_divider_height="0px" top_divider_repeat="20x" hover_enabled="0" saved_tabs="all" global_colors_info="{}" sticky_enabled="0"][et_pb_row column_structure="1_3,1_3,1_3" _builder_version="4.27.4" _module_preset="default" custom_margin="-35px||-35px||true|false" custom_margin_tablet="" custom_margin_phone="" custom_margin_last_edited="on|desktop" global_colors_info="{}"][et_pb_column type="1_3" module_class="side-by-side-2" _builder_version="4.27.4" _module_preset="default" global_colors_info="{}"][et_pb_image src="https://www.cembenchmarking.com/wp-content/uploads/2024/12/logo_white.png" title_text="logo_white" align_tablet="" align_phone="center" align_last_edited="on|phone" _builder_version="4.27.4" _module_preset="default" width="54%" width_tablet="54%" width_phone="54%" width_last_edited="on|tablet" max_width="35%" module_alignment="left" min_height_tablet="" min_height_phone="" min_height_last_edited="on|phone" custom_margin_tablet="" custom_margin_phone="||10px||false|false" custom_margin_last_edited="on|phone" module_alignment_tablet="center" module_alignment_phone="center" module_alignment_last_edited="on|phone" global_colors_info="{}"][/et_pb_image][/et_pb_column][et_pb_column type="1_3" _builder_version="4.16" _module_preset="default" global_colors_info="{}"][et_pb_heading title="Quick links" _builder_version="4.27.4" _module_preset="default" title_font="--et_global_heading_font|600|||||||" title_text_color="#F0F0F0" title_font_size="15px" custom_margin_tablet="" custom_margin_phone="||4px||false|false" custom_margin_last_edited="on|phone" title_text_align_tablet="" title_text_align_phone="center" title_text_align_last_edited="on|phone" global_colors_info="{}"][/et_pb_heading][et_pb_text content_phone="<p><a href=%22https://peerintelligence.cembenchmarking.com/subscribe%22 data-et-target-link=%22_blank%22 rel=%22noopener%22 title=%22Subscribe to newsletter%22>Sign up for Newsletter</a></p>
<p><a href=%22/contact%22>Contact Us</a></p>
<p><a href=%22/careers%22>Careers</a></p>
<p><a href=%22/privacy-policy%22>Privacy Policy</a></p>
<p><a href=%22/confidentiality%22>Confidentiality & Accessibility</a></p>
<p><a href=%22https://www.cembenchmarking.com/identity2/core/logout%22 data-et-target-link=%22_blank%22 rel=%22noopener%22>Logout of all services</a></p>" content_last_edited="off|desktop" _builder_version="4.27.4" _module_preset="default" text_text_color="#ffffff" text_font_size="15px" text_line_height="1.1em" link_text_color="#ffffff" background_layout="dark" custom_margin_tablet="" custom_margin_phone="||10px||false|false" custom_margin_last_edited="on|phone" text_font_size_tablet="15px" text_font_size_phone="15px" text_font_size_last_edited="on|phone" text_orientation_tablet="" text_orientation_phone="center" text_orientation_last_edited="on|phone" global_colors_info="{}" link_text_color__hover_enabled="on|desktop" link_text_color__hover="#bba486" text_text_color__hover_enabled="on|hover" text_text_color__hover="#EDAE49" header_text_color__hover_enabled="on|hover"]<p><a href="https://peerintelligence.cembenchmarking.com/subscribe" target="_blank" rel="noopener" title="Subscribe to newsletter">Sign up for our Peer Intelligence Newsletter</a></p>
<p><a href="/contact">Contact Us</a></p>
<p><a href="/careers">Careers</a></p>
<p><a href="/privacy-policy">Privacy Policy</a></p>
<p><a href="/confidentiality-accessibility">Confidentiality &amp; Accessibility</a></p>
<p><a href="https://www.cembenchmarking.com/identity2/core/logout" target="_blank" rel="noopener">Log out of all services</a></p>[/et_pb_text][/et_pb_column][et_pb_column type="1_3" _builder_version="4.16" _module_preset="default" global_colors_info="{}"][et_pb_heading title="© CEM Benchmarking Inc." _builder_version="4.27.4" _module_preset="default" title_font="--et_global_heading_font|600|||||||" title_text_color="#F0F0F0" title_font_size="15px" custom_margin_tablet="" custom_margin_phone="||4px||false|false" custom_margin_last_edited="on|phone" title_text_align_tablet="" title_text_align_phone="center" title_text_align_last_edited="on|phone" global_colors_info="{}"][/et_pb_heading][et_pb_text _builder_version="4.27.4" _module_preset="default" text_font="--et_global_body_font||||||||" text_font_size="15px" text_line_height="1.8em" background_layout="dark" text_font_size_tablet="14px" text_font_size_phone="15px" text_font_size_last_edited="on|phone" text_orientation_tablet="" text_orientation_phone="center" text_orientation_last_edited="on|phone" global_colors_info="{}"]<p>We provide our clients objective and actionable benchmarking insights to help maximize value for money in investments and pension administration.</p>[/et_pb_text][et_pb_icon font_icon="&#xe0b4;||divi||400" icon_color="#F0F0F0" icon_width="26px" url="https://ca.linkedin.com/company/cem-benchmarking-inc" url_new_window="on" align="left" icon_width_tablet="26px" icon_width_phone="40px" icon_width_last_edited="on|phone" align_tablet="left" align_phone="center" align_last_edited="on|phone" _builder_version="4.27.4" _module_preset="default" background_color="RGBA(255,255,255,0)" global_colors_info="{}" icon_color__hover_enabled="on|hover" icon_color__hover="rgba(237,181,92,0.64)"][/et_pb_icon][/et_pb_column][/et_pb_row][/et_pb_section]